2.4 2.6 2.8 3 3.2 3.4 3.6 )^2c

(GeV/

-e^+em 0 20 40 60 80 100 120 140 160 180

)^2c Entries/(40 MeV/

= 0.4 R < 0.95, chz 0.90 < c < 15 GeV/

ch jet Tp 7 < | < 0.9 y, |^-e^+ e→ψJ/ c > 1 GeV/ ψJ/ Tp

= 13 TeV, TRD s pp data fit, signal fit, background fit, all

/dof = 0.60 2χ

2000

− 1500

− 1000

− 500− 0 500 1000 1500 2000 m) μ pseudo-proper decay-length (

2−10

1−10

1

10

210

310 m) μ Entries/(40

= 0.4 R < 0.95, chz 0.90 < c < 15 GeV/

ch jet Tp 7 < 2c < 3.16 GeV/

-e^+em

2.92 < 0.029 ± = 0.197 Bf’

/dof = 0.67 2χ data fit, all ψ fit, prompt J/ ψ fit, non-prompt J/ fit, bkg

ALI-PUB-620617

ALI-PUB-620617